;==============================================================
;
; bunker_primary_switcher.ltx
;	CoC 1.5b r4 - DoctorX Questlines 2.0
;
;	Modified by: DoctorX
;	Last revised: January 12, 2018
;
;==============================================================


[logic]
active = ph_button@rad_on

[ph_button@rad_on]
anim_blend  = true
anim        = lab_primary_switcher_idle
tooltip     = tips_rad_switcher_press


;//////////////////////////////////////////////////////////////////////////////////////////////////
;
; Switch Brain Scorcher Off Action:
;
;	Modified by DoctorX
;	for DoctorX Questlines 2.0
;	January 12, 2018
;
;--------------------------------------------------------------------------------------------------

; on_press    = ph_button@rad_off % +bar_deactivate_radar_done%
on_press = ph_button@rad_off %+drx_ql_brain_scorcher_switch_off +bar_deactivate_radar_done%

; \\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\


[ph_button@rad_off]
anim_blend  = true
anim        = lab_primary_switcher_off


;//////////////////////////////////////////////////////////////////////////////////////////////////
;
; Switch Brain Scorcher On Action:
;
;	Added by DoctorX
;	for DoctorX Questlines 2.0
;	January 12, 2018
;
;--------------------------------------------------------------------------------------------------

tooltip = drx_ql_tips_activate_brain_scorcher
on_press = ph_button@rad_on %-drx_ql_brain_scorcher_switch_off%

; \\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\
