[labx8_crying]
type = looped
;npc_prefix = false
path = ambient\labx8\labx8_crying
levels = labx8

[pri_b306_generator_start]
type = 3d
path = ambient\pripyat\pri_b306_generator_start
shuffle = seq
idle = 0,0,100

[pri_b306_generator_work]
type = looped
path = ambient\pripyat\pri_b306_generator_work

[pri_b306_elevator_door_use]
type = 3d
path = ambient\pripyat\pri_b306_elevator_door_use
shuffle = rnd
idle = 1,1,100