;==============================================================
;
; DoctorX Keybind Settings (drx_kb_config.ltx)
;	CoC 1.5b r4 - DoctorX Keybinds 1.0
;
;	Created by: DoctorX
;	Last revised: August 17, 2019
;
;==============================================================


;//////////////////////////////////////////////////////////////////////////////////////////////////
;
; Crate Crafter Properties
;
;	Created by DoctorX
;	for DoctorX Keybinds 1.0
;	March 21, 2018
;
;--------------------------------------------------------------------------------------------------

; Crate spawn properties:
[spawn_properties]

; Type of crate to spawn (string, section name):
crate_section = box_wood_01

; Distance in front of player to spawn crate (float, meters)
spawn_dist = 0.8

; Length of time to display out of resources message (float, seconds):
message_time = 3

; \\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\\
